Contents

The following Help Topics are available:

Compatibility

Copyrights and Credits

The Interface Explained

For Help on Help, Press F1


Copyrights and Credits

Visual Man Lite

National Library of Medicine

User License


Visual Man Lite

The Visual Man Lite graphical material and Help file.

Copyright 1996, Digital Enterprises

The Visual Man Lite interface program

Copyright 1996, Christopher J. Romeo

The Visual Man Lite CD-ROM

Copyright 1996, Data Express, Inc.

Visual Man™ is a registered trademark of Data Express, Inc.


National Library of Medicine

The images contained on this CD-ROM were derived from the National Library of Medicines Visible Human Project™,   An effort by the NLM to build a digital image library to advance the progress of medicine and public health.


User License

This CD-ROM disc and all data contained within, is copyrighted and is the sole property of the respective copyright holder.  This license allows you to use the data on a single computer for noncommercial purposes only.  This license is not transferable.  The data shall not be sold, decompiled or reverse engineered in any way whatsoever.  The data shall not be transmitted across a local area network.  The data shall not be transmitted via modem or similar device.  All trademarks, whether marked or not marked are the property of their respective owners.

The commercial use of this CD-ROM disc or its data is prohibited without first obtaining a site license from Data Express, Inc.  Such use includes, but is not limited to, the following: use on an online service, use on a local area network, use that results in the copying of the data, use that involves the public display of the data, use that involves the conversion of the data, or any other use that is not specifically allowed.


Data Express, Inc.

Data Express, Inc.

908 S. Powerline Rd.

Pompano Beach, FL 33069

    Tel: (954) 969-8100

   Fax: (954) 969-8846

Email: Thelton@cris.com


Digital Enterprises

Digital Enterprises

410 Randolph St.

Owosso, MI 48867

   Tel: (517) 725-8520

  Fax: (517) 725-8889

Email: Elcee@tir.com


The Interface Explained

(Actual screen display may differ slightly - screen shot taken under Windows 95)


Up One
Up 3 mm

This button will advance the image number

by one image, moving toward the head.


Down One
Down 3 mm

This button will decrement the image number

by one image, moving toward the feet.


Up Three
Up 9 mm

This button will advance the image number by

three images, moving toward the head.


Down Three
Down 9 mm

This button will decrement the image number by

three images, moving toward the feet.


Save

Invokes the Save dialog box.

Allows you to save the currently loaded

image as JPG, BMP, PCX, or TIF.

Also available from the File Menu.


Print

Invokes the Print dialog Box.

Allows you to print the currently loaded image.

Also available from the File Menu.


Clipboard

Copies the currently displayed image

to the Windows Clipboard

Also available from the File Menu.


Help

Invokes the Windows Help system to

view the Visual Man Lite Help file.


Zoom In

Increases the magnification of the loaded image.

An image must be loaded for this to function.

Zooming enables dragging of the displayed image.

Clicking and dragging the the cursor will change the

portion of the image which is displayed.


Zoom Stop
Zoom Out

Returns you one level backwards in image magnification.

If Zoom level is 1 then no action is taken.


Start Slideshow
Begin Slideshow

Starts a slideshow that you have defined.

Interface must be in Slideshow mode.

This option is enabled via

Option -> Mode -> Slideshow.


Exit

Exits the Visual Man Lite interface.

Also available from the File Menu.


Thumbnail Window

This image is displayed by Single clicking a point on

The Man Selection tool.   Double clicking on this

thumbnail image will display the full-sized version.


The Man Selection tool.

By single clicking on this image, you will see a thumbnail of the

corresponding Axial image from the Visual Man lite database.

Double Clicking will bypass the thumbnail and directly display the

full sized image.


Full Sized Image

This window is opened when you double click on The Man Selection tool,

or when you single click on the Thumbnail window.

When the image is zoomed, you may click on a location to drag and drop, in

order to view areas which do not fit into the display.  Right clicking on this form

when zoom mode is engaged will return you to the 1X view.

This window can be made full screen by using the form maximize button on this window.


Maximize Window

Clicking here will maximize the Full sized image window

to allow a clearer view of the image.


Interactive

Interactive/Slideshow mode menu.  Optional access

to controls available on the man selection tool.

Becomes Slideshow mode commands when you choose

Options -> Mode -> Slideshow


File Menu

Optional access to file saving, printing

and exit functions.


Options

Access to:

           Tips Enable/Disable

           Interface mode toggle

           Info Boxes Enable/Disable


Slideshow Dialog Box

  - Form with Manual Advance option enabled.

   - Form with Manual Advance option disabled


Cancel

This option cancels the current operation.


Manual advance

Causes the slideshow system to wait

for you to manually cycle through

the images.


Slideshow maximize

Instructs the interface to maximize

the display window of the images

which are chosen for the slideshow.


Delay Time

Allows you to specify the number of seconds

between images displayed when in Slideshow

mode.


Ruler

This section is here to help gauge where a

mouse click will be  located on the body.


Compatibility

Visual Man Lite was exclusively developed and tested under Windows 95.

The interface is a 16 bit application, and will run correctly on any host system

with 8 Megabytes of RAM that is running Windows 3.1 or Windows 95.

 For best results, please configure your video display to use 16 or 24 bit color.